HTTP/1.1 200 OK date: Mon, 26 Jan 2026 18:57:09 GMT content-type: text/html; charset=utf-8 vary: Accept-Encoding vary: Accept-Encoding waftime: 0 limittime: 0 render-engine: new x-language: zh_CN pagetype: 3 apidis: 1 api-info: api is not available/fwebapi/product/product/es/findPage?appId=143150160001&templateId=product render-solid: 200 integrity: e1b118f4f25c84b851c67509d6837795 x-server-id: ZGVzaWduY2xvdWQtdHBsb3Blci04N2RiODRkYzktbGw1bDQ= render-status: 200 reqinfo: [{"api":"/fwebapi/product/productCategory/getList"},{"api":"/fwebapi/product/product/es/findPage?appId=143150160001&templateId=product"},{"api":"/fwebapi/cms/lowcode/navigation/8/navList?cate=0"},{"api":"/fwebapi/product/product/getProductDetail"},{"api":"/seo/fwebapi/cms/api/tdk/getTdk"}] pagestr: {"view":"products_details"} instance: new2025042219310565371 unittype: portal-saas x-response-time: 344ms traceid: 392b6f17-2f48-438d-a689-9f87fa0c23a3 referrer-policy: origin-when-cross-origin permissions-policy: camera=() content-security-policy: block-all-mixed-content x-frame-options: SAMEORIGIN x-content-type-options: nosniff origin-agent-cluster: ?0 Server: SLT-MID X-Cache-Lookup: Cache Miss Cache-Control: no-store Content-Length: 274700 X-NWS-LOG-UUID: 856292568505315925 Connection: close X-Cache-Lookup: Cache Miss 1921手持式工程钻机-一竞技股份有限公司官网

languageLanguage
    • 1921手持式工程钻机
    1921手持式工程钻机
    +

    分享到

    1921手持式工程钻机

    机械离合保护装置,超强过载保护能力;

    如有疑问,请拔打产品热线,或是留下您的联系方式,一竞技会即时与您联系!

    • 产品描述

    • 特征

      机械离合保护装置,超强过载保护能力;

      无水封结构钻机、减少维修、寿命更长;

      电流过载保护器,有效保护电机;

      2800瓦超大电机,动力强劲;

      产品参数

      额定电压:220V~

      额定输入功率:2800W

      空载转速:0~1500r/min

      润滑系统:脂润滑

      最大钻孔直径:192mm

      主轴丝扣形式:M22

      净重:6.9Kg

    1921手持式工程钻机

    机械离合保护装置,超强过载保护能力;

    电子邮箱:

    产品热线:

    您可以查看产品画册,如有疑问,请拔打产品热线,或是留下您的联系方式,一竞技会即时与您联系!

    产品画册

    所属分类:

    立即咨询

    如果您对一竞技的产品感兴趣,请留下您的电子邮件,一竞技将尽快与您联系,谢谢!

    提交留言